Pedestals Calib 8583.1

-1

0

1

260 280 300 320 Hut 2.3.3

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.4

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.5

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.6

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.7

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.8

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.9

HI gain 0.0 LO gain 0.0

0

50

300 350 400 Hut 2.3.10

HI gain 386.5 LO gain 325.2

-1

0

1

260 280 300 320

Hut 2.3.11

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.12

HI gain 0.0 LO gain 0.0

Pedestals Calib 8583.1

-1

0

1

260 280 300 320

Hut 2.3.13

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.14

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.3

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.4

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.5

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.6

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.7

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.8

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.9

HI gain 0.0 LO gain 0.0

0

50

400 450 500 Hut 2.4.10

HI gain 453.8 LO gain 407.4

Pedestals Calib 8583.1

-1

0

1

260 280 300 320

Hut 2.4.11

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.12

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320

Hut 2.4.13

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.14

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.5.3

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.5.4

HI gain 0.0 LO gain 0.0

0

50

100

255 260 265 270 Hut 2.5.5

HI gain 0.0 LO gain 391.2

0

50

260 270 Hut 2.5.6

HI gain 0.0 LO gain 401.9

0

50

100

260 270 280 290 Hut 2.5.7

HI gain 0.0 LO gain 440.0

0 50 100

260 270 280 Hut 2.5.8

HI gain 0.0 LO gain 422.5

Pedestals Calib 8583.1

0

20

252.5 255 257.5 260

Hut 2.5.9

HI gain 0.0 LO gain 371.4

0

50

100

350 400 450 Hut 2.5.10

HI gain 407.9 LO gain 373.8

0 50 100

260 280 300

Hut 2.6.3

HI gain 0.0 LO gain 487.6

0

50

100

255 260 265 270 Hut 2.6.4

HI gain 0.0 LO gain 397.9

0 50 100

260 280 300 320 Hut 2.6.5

HI gain 0.0 LO gain 520.2

0

50

100

260 280 300 Hut 2.6.6

HI gain 0.0 LO gain 480.2

0

50

100

251 252 253

Hut 2.6.7

HI gain 0.0 LO gain 355.9

0 50 100

260 270 280 290 Hut 2.6.8

HI gain 0.0 LO gain 432.4

0

50

100

260 270 Hut 2.6.9

HI gain 0.0 LO gain 405.0

0

50

100

350 400 450 Hut 2.6.10

HI gain 384.4 LO gain 373.4

Pedestals Calib 8583.1

-1

0

1

260 280 300 320

Hut 2.6.13

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.6.14

HI gain 0.0 LO gain 0.0

0 50 100

252 254 256 258 260

Hut 2.7.3

HI gain 0.0 LO gain 370.3

0

50

100

260 270 280 Hut 2.7.4

HI gain 0.0 LO gain 413.4

0

50

100

260 270 280 Hut 2.7.5

HI gain 0.0 LO gain 421.9

0

50

100

260 270 280 Hut 2.7.6

HI gain 0.0 LO gain 428.8

0

50

251 252 253 254 255 Hut 2.7.7

HI gain 0.0 LO gain 360.9

0 50 100

260 280 300 Hut 2.7.8

HI gain 0.0 LO gain 471.3

0

50

255 260 265 270 Hut 2.7.9

HI gain 0.0 LO gain 398.4

0

50

100

350 400 450 Hut 2.7.10

HI gain 392.7 LO gain 447.6

Pedestals Calib 8583.1

-1

0

1

260 280 300 320

Hut 2.7.13

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.7.14

HI gain 0.0 LO gain 0.0

0

50

100

255 260 265 270 Hut 2.8.3

HI gain 0.0 LO gain 391.3

0

50

260 270 Hut 2.8.4

HI gain 0.0 LO gain 405.7

0

50

260 280 300 320 Hut 2.8.5

HI gain 0.0 LO gain 490.2

0

50

260 270 280 290 Hut 2.8.6

HI gain 0.0 LO gain 444.0

0

50

260 280 300

Hut 2.8.7

HI gain 0.0 LO gain 465.7

0

50

260 270 280 Hut 2.8.8

HI gain 0.0 LO gain 419.7

0

50

260 280 300 320 340 Hut 2.8.9

HI gain 0.0 LO gain 539.8

0

50

100

450 500 550 Hut 2.8.10

HI gain 467.1 LO gain 499.1

Pedestals Calib 8583.1

0 25 50

260 270 280 290 Hut 2.9.3

HI gain 0.0 LO gain 433.7

0

50

260 280 300 Hut 2.9.4

HI gain 0.0 LO gain 484.4

0

50

252 254 256 Hut 2.9.5

HI gain 0.0 LO gain 363.2

0 25 50

260 280 300 Hut 2.9.6

HI gain 0.0 LO gain 472.3

0

50

255 260 265 Hut 2.9.7

HI gain 0.0 LO gain 384.3

0 25 50

260 270 280 Hut 2.9.8

HI gain 0.0 LO gain 414.7

0 25 50

300 350 400 Hut 2.9.9

HI gain 408.1 LO gain 340.4

0

50

350 400 450 Hut 2.10.4

HI gain 354.8 LO gain 429.4

0

50

400 450 500 550 Hut 2.10.5

HI gain 435.2 LO gain 515.4

0

50

100

400 450 500 Hut 2.10.6

HI gain 426.2 LO gain 439.6

Pedestals Calib 8583.1

0

50

100

350 400 450 Hut 2.10.7

HI gain 422.0 LO gain 411.2

0

50

350 400 450 Hut 2.10.8

HI gain 424.4 LO gain 371.7

0 50 100

400 450 500 Hut 2.10.9

HI gain 465.6 LO gain 455.8

0 25 50

300 350 400 Hut 2.11.3

HI gain 340.1 LO gain 381.5

0 25 50

400 450 500 Hut 2.11.4

HI gain 419.2 LO gain 472.0

0

25

50

300 350 400 Hut 2.11.5

HI gain 417.7 LO gain 251.0

0

50

400 450 500 Hut 2.11.6

HI gain 455.9 LO gain 409.7

-1

0

1

260 280 300 320 Hut 2.11.7

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320

Hut 2.11.8

HI gain 0.0 LO gain 0.0

0

50

300 350 400 Hut 2.12.3

HI gain 382.2 LO gain 344.8

Pedestals Calib 8583.1

0 25 50

450 500 550 Hut 2.12.4

HI gain 465.4 LO gain 505.4

0 25 50

350 400 450 Hut 2.12.5

HI gain 385.7 LO gain 453.7

0

50

350 400 450 Hut 2.12.6

HI gain 395.2 LO gain 393.7

0

50

260 270 280 Hut 2.12.7

HI gain 0.0 LO gain 410.5

-1

0

1

260 280 300 320

Hut 2.12.8

HI gain 0.0 LO gain 0.0

0

50

400 450 500 Hut 2.13.3

HI gain 381.9 LO gain 532.4

0

50

450 500 550 Hut 2.13.4

HI gain 441.5 LO gain 532.3

0

50

400 450 500 Hut 2.13.5

HI gain 412.2 LO gain 527.0

0

50

100

350 400 450 Hut 2.13.6

HI gain 343.8 LO gain 499.0

0

50

100

300 350 400 Hut 2.13.7

HI gain 389.8 LO gain 333.9

Pedestals Calib 8583.1

0 50 100

350 400 450 Hut 2.13.8

HI gain 410.3 LO gain 426.8

0

50

100

350 400 450 Hut 2.14.3

HI gain 356.7 LO gain 415.2

0 25 50

400 450 500 Hut 2.14.4

HI gain 477.3 LO gain 454.2

0

25

50

300 350 400 Hut 2.14.5

HI gain 268.6 LO gain 390.3

0

20

40

400 450 500 Hut 2.14.6

HI gain 495.8 LO gain 421.0

0 25 50

300 350 400 Hut 2.14.7

HI gain 322.5 LO gain 387.2

0

50

100

300 350 400 Hut 2.14.8

HI gain 360.5 LO gain 385.2

LP calibrations Calib 8583.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1079. 108.6

Hut 2.3.3 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1079. 108.6

Hut 2.3.3

Hut 2.3.3 TDC counts

Events

HImean = 3445.2 LOmean = 3477.8

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1334. 139.1

Hut 2.3.4 TDC counts

Events

0

100

200

1350 1400 1450

Entries Mean RMS 800 1334. 139.1

Hut 2.3.4

Hut 2.3.4 TDC counts

Events

HImean = 3585.1 LOmean = 3609.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1070. 1.986

Hut 2.3.5 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1070. 1.986

Hut 2.3.5

Hut 2.3.5 TDC counts

Events

HImean = 3669.8 LOmean = 3495.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1057. 1.827

Hut 2.3.6 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1057. 1.827

Hut 2.3.6

Hut 2.3.6 TDC counts

Events

HImean = 3539.2 LOmean = 3012.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1019. 109.0

Hut 2.3.7 TDC counts

Events

0

100

1000 1050 1100

Entries Mean RMS 800 1019. 109.0

Hut 2.3.7

Hut 2.3.7 TDC counts

Events

HImean = 3403.6 LOmean = 3099.0

LP calibrations Calib 8583.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1150. 1.834

Hut 2.3.8 TDC counts

Events

0

100

200

1100 1150 1200 1250

Entries Mean RMS 800 1150. 1.834

Hut 2.3.8

Hut 2.3.8 TDC counts

Events

HImean = 3647.1 LOmean = 3269.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1551. 31.72

Hut 2.3.9 TDC counts

Events

0

100

1500 1550 1600 1650

Entries Mean RMS 800 1551. 31.72

Hut 2.3.9

Hut 2.3.9 TDC counts

Events

HImean = 3354.9 LOmean = 3272.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2222. 34.76

Hut 2.3.10 TDC counts

Events

0

100

2200 2250 2300

Entries Mean RMS 800 2222. 34.76

Hut 2.3.10

Hut 2.3.10 TDC counts

Events

HImean = 1237.5 LOmean = 1108.4

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 595.0 5.002

Hut 2.3.11 TDC counts

Events

0

100

200

550 600 650

Entries Mean RMS 800 595.0 5.002

Hut 2.3.11

Hut 2.3.11 TDC counts

Events

HImean = 3489.4 LOmean = 2947.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 936.7 4.405

Hut 2.3.12 TDC counts

Events

0

100

900 950 1000

Entries Mean RMS 800 936.7 4.405

Hut 2.3.12

Hut 2.3.12 TDC counts

Events

HImean = 4040.5 LOmean = 3034.7

LP calibrations Calib 8583.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 709.5 7.918

Hut 2.3.13 TDC counts

Events

0

100

200

700 750 800

Entries Mean RMS 800 709.5 7.918

Hut 2.3.13

Hut 2.3.13 TDC counts

Events

HImean = 3111.4 LOmean = 2588.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 821.1 115.9

Hut 2.3.14 TDC counts

Events

0

100

800 850 900

Entries Mean RMS 800 821.1 115.9

Hut 2.3.14

Hut 2.3.14 TDC counts

Events

HImean = 3726.7 LOmean = 2744.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1131. 2.108

Hut 2.4.3 TDC counts

Events

0

100

200

1100 1150 1200

Entries Mean RMS 800 1131. 2.108

Hut 2.4.3

Hut 2.4.3 TDC counts

Events

HImean = 3261.2 LOmean = 3321.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1452. 93.54

Hut 2.4.4 TDC counts

Events

0

100

1400 1450 1500

Entries Mean RMS 800 1452. 93.54

Hut 2.4.4

Hut 2.4.4 TDC counts

Events

HImean = 3478.5 LOmean = 3490.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1355. 3.749

Hut 2.4.5 TDC counts

Events

0

100

1350 1400 1450

Entries Mean RMS 800 1355. 3.749

Hut 2.4.5

Hut 2.4.5 TDC counts

Events

HImean = 3658.9 LOmean = 3438.3

LP calibrations Calib 8583.1

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.4.6 TDC counts

Events

0

500

4060 4080 4100

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.4.6

Hut 2.4.6 TDC counts

Events

HImean = 2581.0 LOmean = 2548.1

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.4.7 TDC counts

Events

0

500

4060 4080 4100

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.4.7

Hut 2.4.7 TDC counts

Events

HImean = 2490.9 LOmean = 2552.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1039. 1.852

Hut 2.4.8 TDC counts

Events

0

100

1000 1050 1100

Entries Mean RMS 800 1039. 1.852

Hut 2.4.8

Hut 2.4.8 TDC counts

Events

HImean = 3334.1 LOmean = 3507.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1057. 2.007

Hut 2.4.9 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1057. 2.007

Hut 2.4.9

Hut 2.4.9 TDC counts

Events

HImean = 3997.8 LOmean = 3584.9

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 711.1 120.3

Hut 2.4.10 TDC counts

Events

0

100

200

700 750 800

Entries Mean RMS 800 711.1 120.3

Hut 2.4.10

Hut 2.4.10 TDC counts

Events

HImean = 1095.3 LOmean = 1366.1

LP calibrations Calib 8583.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 653.1 147.1

Hut 2.4.11 TDC counts

Events

0

100

200

600 650 700

Entries Mean RMS 800 653.1 147.1

Hut 2.4.11

Hut 2.4.11 TDC counts

Events

HImean = 2799.2 LOmean = 2604.6

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 871.8 2.882

Hut 2.4.12 TDC counts

Events

0 50 100

850 900 950

Entries Mean RMS 800 871.8 2.882

Hut 2.4.12

Hut 2.4.12 TDC counts

Events

HImean = 3358.5 LOmean = 2680.4

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 794.5 63.35

Hut 2.4.13 TDC counts

Events

0

100

200

750 800 850

Entries Mean RMS 800 794.5 63.35

Hut 2.4.13

Hut 2.4.13 TDC counts

Events

HImean = 3871.2 LOmean = 4095.5

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.4.14 TDC counts

Events

0

500

4060 4080 4100

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.4.14

Hut 2.4.14 TDC counts

Events

HImean = 2686.4 LOmean = 2652.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1233. 32.85

Hut 2.5.3 TDC counts

Events

0

100

1200 1250 1300

Entries Mean RMS 800 1233. 32.85

Hut 2.5.3

Hut 2.5.3 TDC counts

Events

HImean = 3502.3 LOmean = 3344.0

LP calibrations Calib 8583.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1323. 98.25

Hut 2.5.4 TDC counts

Events

0

100

1300 1350 1400

Entries Mean RMS 800 1323. 98.25

Hut 2.5.4

Hut 2.5.4 TDC counts

Events

HImean = 3435.6 LOmean = 3383.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1122. 1.853

Hut 2.5.5 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1122. 1.853

Hut 2.5.5

Hut 2.5.5 TDC counts

Events

HImean = 3301.1 LOmean = 1259.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1144. 6.230

Hut 2.5.6 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1144. 6.230

Hut 2.5.6

Hut 2.5.6 TDC counts

Events

HImean = 3624.7 LOmean = 1198.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1156. 1.674

Hut 2.5.7 TDC counts

Events

0

100

200

1150 1200 1250

Entries Mean RMS 800 1156. 1.674

Hut 2.5.7

Hut 2.5.7 TDC counts

Events

HImean = 3371.7 LOmean = 780.3

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1068. 4.473

Hut 2.5.8 TDC counts

Events

0

100

200

1050 1100 1150

Entries Mean RMS 800 1068. 4.473

Hut 2.5.8

Hut 2.5.8 TDC counts

Events

HImean = 3293.6 LOmean = 1191.0

LP calibrations Calib 8583.1

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 2153. 1160.

Hut 2.5.9 TDC counts

Events

-1

0

1

2050 2100 2150

Entries Mean RMS 800 2153. 1160.

Hut 2.5.9

Hut 2.5.9 TDC counts

Events

HImean = 3303.4 LOmean = 4095.5

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 726.8 10.84

Hut 2.5.10 TDC counts

Events

0

100

200

700 750 800

Entries Mean RMS 800 726.8 10.84

Hut 2.5.10

Hut 2.5.10 TDC counts

Events

HImean = 930.7 LOmean = 1223.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1359. 8.022

Hut 2.6.3 TDC counts

Events

0

100

1350 1400 1450

Entries Mean RMS 800 1359. 8.022

Hut 2.6.3

Hut 2.6.3 TDC counts

Events

HImean = 3370.9 LOmean = 1200.2

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 855.4 114.6

Hut 2.6.4 TDC counts

Events

0

100

200

850 900 950

Entries Mean RMS 800 855.4 114.6

Hut 2.6.4

Hut 2.6.4 TDC counts

Events

HImean = 3328.2 LOmean = 1307.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1064. 1.888

Hut 2.6.5 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1064. 1.888

Hut 2.6.5

Hut 2.6.5 TDC counts

Events

HImean = 3281.0 LOmean = 1022.4

LP calibrations Calib 8583.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1012. 6.749

Hut 2.6.6 TDC counts

Events

0

100

200

1000 1050 1100

Entries Mean RMS 800 1012. 6.749

Hut 2.6.6

Hut 2.6.6 TDC counts

Events

HImean = 3188.2 LOmean = 1082.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1160. 1.907

Hut 2.6.7 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1160. 1.907

Hut 2.6.7

Hut 2.6.7 TDC counts

Events

HImean = 3447.8 LOmean = 1079.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1239. 143.0

Hut 2.6.8 TDC counts

Events

0

100

1250 1300 1350

Entries Mean RMS 800 1239. 143.0

Hut 2.6.8

Hut 2.6.8 TDC counts

Events

HImean = 3489.1 LOmean = 1122.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1113. 149.3

Hut 2.6.9 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1113. 149.3

Hut 2.6.9

Hut 2.6.9 TDC counts

Events

HImean = 3179.7 LOmean = 1188.6

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1633. 1.809

Hut 2.6.10 TDC counts

Events

0

100

200

1600 1650 1700

Entries Mean RMS 800 1633. 1.809

Hut 2.6.10

Hut 2.6.10 TDC counts

Events

HImean = 1181.9 LOmean = 1348.7

LP calibrations Calib 8583.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1071. 4.515

Hut 2.6.13 TDC counts

Events

0

100

200

1050 1100 1150

Entries Mean RMS 800 1071. 4.515

Hut 2.6.13

Hut 2.6.13 TDC counts

Events

HImean = 3687.1 LOmean = 2938.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 838.6 2.150

Hut 2.6.14 TDC counts

Events

0

100

800 850 900

Entries Mean RMS 800 838.6 2.150

Hut 2.6.14

Hut 2.6.14 TDC counts

Events

HImean = 3732.6 LOmean = 3920.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1431. 94.30

Hut 2.7.3 TDC counts

Events

0

100

1400 1450 1500

Entries Mean RMS 800 1431. 94.30

Hut 2.7.3

Hut 2.7.3 TDC counts

Events

HImean = 3516.3 LOmean = 1130.6

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1562. 1.904

Hut 2.7.4 TDC counts

Events

0

100

200

1550 1600 1650

Entries Mean RMS 800 1562. 1.904

Hut 2.7.4

Hut 2.7.4 TDC counts

Events

HImean = 3524.5 LOmean = 1163.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1066. 6.542

Hut 2.7.5 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1066. 6.542

Hut 2.7.5

Hut 2.7.5 TDC counts

Events

HImean = 3349.7 LOmean = 1096.6

LP calibrations Calib 8583.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1420. 1.717

Hut 2.7.6 TDC counts

Events

0

100

1400 1450 1500

Entries Mean RMS 800 1420. 1.717

Hut 2.7.6

Hut 2.7.6 TDC counts

Events

HImean = 3166.8 LOmean = 1158.3

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1188. 102.9

Hut 2.7.7 TDC counts

Events

0

100

200

1150 1200 1250

Entries Mean RMS 800 1188. 102.9

Hut 2.7.7

Hut 2.7.7 TDC counts

Events

HImean = 3381.3 LOmean = 1166.5

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1578. 18.38

Hut 2.7.8 TDC counts

Events

0

100

200

1550 1600 1650

Entries Mean RMS 800 1578. 18.38

Hut 2.7.8

Hut 2.7.8 TDC counts

Events

HImean = 3524.4 LOmean = 4095.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1283. 101.6

Hut 2.7.9 TDC counts

Events

0

100

1250 1300 1350

Entries Mean RMS 800 1283. 101.6

Hut 2.7.9

Hut 2.7.9 TDC counts

Events

HImean = 3424.9 LOmean = 1438.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1465. 57.05

Hut 2.7.10 TDC counts

Events

0

100

1450 1500 1550

Entries Mean RMS 800 1465. 57.05

Hut 2.7.10

Hut 2.7.10 TDC counts

Events

HImean = 1105.4 LOmean = 1088.6

LP calibrations Calib 8583.1

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.7.13 TDC counts

Events

0

500

4060 4080 4100

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.7.13

Hut 2.7.13 TDC counts

Events

HImean = 2493.8 LOmean = 2503.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 899.0 196.3

Hut 2.7.14 TDC counts

Events

0

100

200

850 900 950

Entries Mean RMS 800 899.0 196.3

Hut 2.7.14

Hut 2.7.14 TDC counts

Events

HImean = 3624.7 LOmean = 3014.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1111. 105.6

Hut 2.8.3 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1111. 105.6

Hut 2.8.3

Hut 2.8.3 TDC counts

Events

HImean = 3398.9 LOmean = 1116.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1102. 2.546

Hut 2.8.4 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1102. 2.546

Hut 2.8.4

Hut 2.8.4 TDC counts

Events

HImean = 3353.4 LOmean = 868.9

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1330. 1.760

Hut 2.8.5 TDC counts

Events

0

100

200

1300 1350 1400

Entries Mean RMS 800 1330. 1.760

Hut 2.8.5

Hut 2.8.5 TDC counts

Events

HImean = 3819.6 LOmean = 896.5

LP calibrations Calib 8583.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1224. 101.6

Hut 2.8.6 TDC counts

Events

0

100

200

1200 1250 1300

Entries Mean RMS 800 1224. 101.6

Hut 2.8.6

Hut 2.8.6 TDC counts

Events

HImean = 3449.5 LOmean = 4013.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 902.4 122.3

Hut 2.8.7 TDC counts

Events

0

100

900 950 1000

Entries Mean RMS 800 902.4 122.3

Hut 2.8.7

Hut 2.8.7 TDC counts

Events

HImean = 3479.6 LOmean = 1214.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1177. 3.761

Hut 2.8.8 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1177. 3.761

Hut 2.8.8

Hut 2.8.8 TDC counts

Events

HImean = 3326.5 LOmean = 1082.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1086. 3.143

Hut 2.8.9 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1086. 3.143

Hut 2.8.9

Hut 2.8.9 TDC counts

Events

HImean = 3555.7 LOmean = 1334.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2197. 17.51

Hut 2.8.10 TDC counts

Events

0

100

2150 2200 2250

Entries Mean RMS 800 2197. 17.51

Hut 2.8.10

Hut 2.8.10 TDC counts

Events

HImean = 466.0 LOmean = 619.2

LP calibrations Calib 8583.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1036. 108.3

Hut 2.9.3 TDC counts

Events

0

100

1000 1050 1100

Entries Mean RMS 800 1036. 108.3

Hut 2.9.3

Hut 2.9.3 TDC counts

Events

HImean = 3368.1 LOmean = 1159.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1286. 1.958

Hut 2.9.4 TDC counts

Events

0

100

1250 1300 1350

Entries Mean RMS 800 1286. 1.958

Hut 2.9.4

Hut 2.9.4 TDC counts

Events

HImean = 3326.2 LOmean = 1024.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1113. 1.817

Hut 2.9.5 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1113. 1.817

Hut 2.9.5

Hut 2.9.5 TDC counts

Events

HImean = 3374.7 LOmean = 2379.5

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1366. 1.795

Hut 2.9.6 TDC counts

Events

0

100

200

1350 1400 1450

Entries Mean RMS 800 1366. 1.795

Hut 2.9.6

Hut 2.9.6 TDC counts

Events

HImean = 3583.4 LOmean = 2740.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1180. 2.005

Hut 2.9.7 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1180. 2.005

Hut 2.9.7

Hut 2.9.7 TDC counts

Events

HImean = 3480.3 LOmean = 853.3

LP calibrations Calib 8583.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 964.5 1.766

Hut 2.9.8 TDC counts

Events

0

100

950 1000 1050

Entries Mean RMS 800 964.5 1.766

Hut 2.9.8

Hut 2.9.8 TDC counts

Events

HImean = 3582.0 LOmean = 1560.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1408. 17.60

Hut 2.9.9 TDC counts

Events

0

100

1400 1450 1500

Entries Mean RMS 800 1408. 17.60

Hut 2.9.9

Hut 2.9.9 TDC counts

Events

HImean = 1389.1 LOmean = 1134.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1152. 182.5

Hut 2.10.4 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1152. 182.5

Hut 2.10.4

Hut 2.10.4 TDC counts

Events

HImean = 1284.6 LOmean = 1174.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1003. 1.728

Hut 2.10.5 TDC counts

Events

0

100

1000 1050 1100

Entries Mean RMS 800 1003. 1.728

Hut 2.10.5

Hut 2.10.5 TDC counts

Events

HImean = 1228.0 LOmean = 1218.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 890.5 113.4

Hut 2.10.6 TDC counts

Events

0

100

850 900 950

Entries Mean RMS 800 890.5 113.4

Hut 2.10.6

Hut 2.10.6 TDC counts

Events

HImean = 1357.7 LOmean = 1202.2

LP calibrations Calib 8583.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 755.1 205.0

Hut 2.10.7 TDC counts

Events

0

100

750 800 850

Entries Mean RMS 800 755.1 205.0

Hut 2.10.7

Hut 2.10.7 TDC counts

Events

HImean = 769.4 LOmean = 2311.0

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4059. 258.5

Hut 2.10.8 TDC counts

Events

0

500

4040 4060 4080 4100

Entries Mean RMS 800 4059. 258.5

Hut 2.10.8

Hut 2.10.8 TDC counts

Events

HImean = 434.6 LOmean = 383.7

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.10.9 TDC counts

Events

0

500

4060 4080 4100

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.10.9

Hut 2.10.9 TDC counts

Events

HImean = 483.0 LOmean = 466.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1406. 95.16

Hut 2.11.3 TDC counts

Events

0

100

1400 1450 1500

Entries Mean RMS 800 1406. 95.16

Hut 2.11.3

Hut 2.11.3 TDC counts

Events

HImean = 1298.8 LOmean = 929.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1202. 205.8

Hut 2.11.4 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1202. 205.8

Hut 2.11.4

Hut 2.11.4 TDC counts

Events

HImean = 1315.6 LOmean = 1265.3

LP calibrations Calib 8583.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 978.0 223.0

Hut 2.11.5 TDC counts

Events

0

100

200

950 1000 1050

Entries Mean RMS 800 978.0 223.0

Hut 2.11.5

Hut 2.11.5 TDC counts

Events

HImean = 971.8 LOmean = 944.4

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 757.3 118.6

Hut 2.11.6 TDC counts

Events

0 50 100

700 750 800 850

Entries Mean RMS 800 757.3 118.6

Hut 2.11.6

Hut 2.11.6 TDC counts

Events

HImean = 1325.6 LOmean = 993.0

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 709.2 170.0

Hut 2.11.7 TDC counts

Events

0

100

200

650 700 750 800

Entries Mean RMS 800 709.2 170.0

Hut 2.11.7

Hut 2.11.7 TDC counts

Events

HImean = 3128.3 LOmean = 2672.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 848.4 1.959

Hut 2.11.8 TDC counts

Events

0

100

800 850 900

Entries Mean RMS 800 848.4 1.959

Hut 2.11.8

Hut 2.11.8 TDC counts

Events

HImean = 3575.1 LOmean = 2831.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 909.0 27.80

Hut 2.12.3 TDC counts

Events

0

100

900 950 1000

Entries Mean RMS 800 909.0 27.80

Hut 2.12.3

Hut 2.12.3 TDC counts

Events

HImean = 1312.4 LOmean = 1112.8

LP calibrations Calib 8583.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 812.7 17.07

Hut 2.12.4 TDC counts

Events

0

100

800 850 900

Entries Mean RMS 800 812.7 17.07

Hut 2.12.4

Hut 2.12.4 TDC counts

Events

HImean = 1305.2 LOmean = 1251.7

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 792.0 234.2

Hut 2.12.5 TDC counts

Events

0

100

200

750 800 850

Entries Mean RMS 800 792.0 234.2

Hut 2.12.5

Hut 2.12.5 TDC counts

Events

HImean = 1329.0 LOmean = 1177.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1102. 1.876

Hut 2.12.6 TDC counts

Events

0

100

200

1100 1150 1200

Entries Mean RMS 800 1102. 1.876

Hut 2.12.6

Hut 2.12.6 TDC counts

Events

HImean = 1161.3 LOmean = 1573.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 663.3 21.40

Hut 2.12.7 TDC counts

Events

0

100

650 700 750

Entries Mean RMS 800 663.3 21.40

Hut 2.12.7

Hut 2.12.7 TDC counts

Events

HImean = 3791.7 LOmean = 573.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 877.5 78.61

Hut 2.12.8 TDC counts

Events

0

100

850 900 950

Entries Mean RMS 800 877.5 78.61

Hut 2.12.8

Hut 2.12.8 TDC counts

Events

HImean = 3606.9 LOmean = 2657.9

LP calibrations Calib 8583.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 807.6 1.823

Hut 2.13.3 TDC counts

Events

0

100

800 850 900

Entries Mean RMS 800 807.6 1.823

Hut 2.13.3

Hut 2.13.3 TDC counts

Events

HImean = 1280.6 LOmean = 1321.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1524. 129.6

Hut 2.13.4 TDC counts

Events

0

100

1500 1550 1600

Entries Mean RMS 800 1524. 129.6

Hut 2.13.4

Hut 2.13.4 TDC counts

Events

HImean = 1329.7 LOmean = 1315.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 634.1 13.22

Hut 2.13.5 TDC counts

Events

0

100

600 650 700

Entries Mean RMS 800 634.1 13.22

Hut 2.13.5

Hut 2.13.5 TDC counts

Events

HImean = 1349.0 LOmean = 1238.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 813.8 1.914

Hut 2.13.6 TDC counts

Events

0

100

800 850 900

Entries Mean RMS 800 813.8 1.914

Hut 2.13.6

Hut 2.13.6 TDC counts

Events

HImean = 1289.2 LOmean = 1181.0

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1200. 1.760

Hut 2.13.7 TDC counts

Events

0

100

200

1150 1200 1250 1300

Entries Mean RMS 800 1200. 1.760

Hut 2.13.7

Hut 2.13.7 TDC counts

Events

HImean = 579.2 LOmean = 345.5

LP calibrations Calib 8583.1

0

50

100

0 1000 2000 3000 4000

Entries Mean RMS 800 972.9 45.22

Hut 2.13.8 TDC counts

Events

0

50

100

950 1000 1050

Entries Mean RMS 800 972.9 45.22

Hut 2.13.8

Hut 2.13.8 TDC counts

Events

HImean = 1028.3 LOmean = 513.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 937.5 1.740

Hut 2.14.3 TDC counts

Events

0

100

900 950 1000

Entries Mean RMS 800 937.5 1.740

Hut 2.14.3

Hut 2.14.3 TDC counts

Events

HImean = 1206.6 LOmean = 1161.9

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1026. 154.1

Hut 2.14.4 TDC counts

Events

0

100

200

1000 1050 1100

Entries Mean RMS 800 1026. 154.1

Hut 2.14.4

Hut 2.14.4 TDC counts

Events

HImean = 1594.3 LOmean = 1713.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 878.9 9.991

Hut 2.14.5 TDC counts

Events

0

100

850 900 950

Entries Mean RMS 800 878.9 9.991

Hut 2.14.5

Hut 2.14.5 TDC counts

Events

HImean = 1133.3 LOmean = 3838.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 931.7 20.65

Hut 2.14.6 TDC counts

Events

0

100

900 950 1000

Entries Mean RMS 800 931.7 20.65

Hut 2.14.6

Hut 2.14.6 TDC counts

Events

HImean = 1385.0 LOmean = 2264.7

LP calibrations Calib 8583.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1183. 11.62

Hut 2.14.7 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1183. 11.62

Hut 2.14.7

Hut 2.14.7 TDC counts

Events

HImean = 1477.7 LOmean = 2811.5

0

50

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1159. 103.9

Hut 2.14.8 TDC counts

Events

0

50

100

1150 1200 1250

Entries Mean RMS 800 1159. 103.9

Hut 2.14.8

Hut 2.14.8 TDC counts

Events

HImean = 1031.9 LOmean = 473.4

TDC calibrations Calib 8583.1

0 2500

5000

10 20 30

11.32 / 15 P1 277.3 P2 151.9

icalid

(TDC counts)

Hut 2.3.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.3

Hut 2.3.3 icalid

Δfit (TDC counts)

0.16458 ns/TDCcount

0 2500

5000

10 20 30

6.560 / 14 P1 469.6 P2 156.0

icalid

(TDC counts)

Hut 2.3.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.4

Hut 2.3.4 icalid

Δfit (TDC counts)

0.160207 ns/TDCcount

0 2500

5000

10 20 30

5.943 / 14 P1 230.0 P2 155.8

icalid

(TDC counts)

Hut 2.3.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.5

Hut 2.3.5 icalid

Δfit (TDC counts)

0.160488 ns/TDCcount

0 2500

5000

10 20 30

9.121 / 14 P1 209.6 P2 152.1

icalid

(TDC counts)

Hut 2.3.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.6

Hut 2.3.6 icalid

Δfit (TDC counts)

0.164409 ns/TDCcount

0 2500

5000

10 20 30

17.22 / 14 P1 189.6 P2 157.1

icalid

(TDC counts)

Hut 2.3.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.7

Hut 2.3.7 icalid

Δfit (TDC counts)

0.159177 ns/TDCcount

TDC calibrations Calib 8583.1

0 2500

5000

10 20 30

14.64 / 14 P1 300.2 P2 157.3

icalid

(TDC counts)

Hut 2.3.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.8

Hut 2.3.8 icalid

Δfit (TDC counts)

0.158895 ns/TDCcount

0 2000

4000

10 20 30

27.04 / 15 P1 30.55 P2 150.8

icalid

(TDC counts)

Hut 2.3.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.9

Hut 2.3.9 icalid

Δfit (TDC counts)

0.165787 ns/TDCcount

0 2500

5000

10 20 30

30.46 / 15 P1 414.3 P2 151.4

icalid

(TDC counts)

Hut 2.3.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.10

Hut 2.3.10 icalid

Δfit (TDC counts)

0.165112 ns/TDCcount

0 2000

4000

10 20 30

22.60 / 15 P1 -133.5 P2 150.1

icalid

(TDC counts)

Hut 2.3.11

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.11

Hut 2.3.11 icalid

Δfit (TDC counts)

0.166609 ns/TDCcount

0

2500

5000

10 20 30

23.80 / 15 P1 154.8 P2 151.0

icalid

(TDC counts)

Hut 2.3.12

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.12

Hut 2.3.12 icalid

Δfit (TDC counts)

0.165538 ns/TDCcount

TDC calibrations Calib 8583.1

0 2000

4000

10 20 30

26.99 / 14 P1 -110.5 P2 150.8

icalid

(TDC counts)

Hut 2.3.13

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.13

Hut 2.3.13 icalid

Δfit (TDC counts)

0.165776 ns/TDCcount

0 2000

4000

10 20 30

33.66 / 15 P1 43.97 P2 149.4

icalid

(TDC counts)

Hut 2.3.14

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.14

Hut 2.3.14 icalid

Δfit (TDC counts)

0.167376 ns/TDCcount

0 2500

5000

10 20 30

10.92 / 14 P1 297.1 P2 153.9

icalid

(TDC counts)

Hut 2.4.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.3

Hut 2.4.3 icalid

Δfit (TDC counts)

0.16244 ns/TDCcount

0 2500

5000

10 20 30

5.973 / 13 P1 494.9 P2 158.3

icalid

(TDC counts)

Hut 2.4.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.4

Hut 2.4.4 icalid

Δfit (TDC counts)

0.157889 ns/TDCcount

0

2000

4000

10 20 30

0.4406E+07/ 15 P1 1175. P2 88.84

icalid

(TDC counts)

Hut 2.4.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.5

Hut 2.4.5 icalid

Δfit (TDC counts)

0.281411 ns/TDCcount

TDC calibrations Calib 8583.1

0 2500

5000

10 20 30

6.246 / 13 P1 504.9 P2 158.0

icalid

(TDC counts)

Hut 2.4.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.6

Hut 2.4.6 icalid

Δfit (TDC counts)

0.158263 ns/TDCcount

0 2500

5000

10 20 30

9.685 / 13 P1 358.6 P2 158.3

icalid

(TDC counts)

Hut 2.4.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.7

Hut 2.4.7 icalid

Δfit (TDC counts)

0.157919 ns/TDCcount

0 2500

5000

10 20 30

8.063 / 14 P1 293.0 P2 157.4

icalid

(TDC counts)

Hut 2.4.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.8

Hut 2.4.8 icalid

Δfit (TDC counts)

0.158804 ns/TDCcount

0 2500

5000

10 20 30

9.217 / 14 P1 340.1 P2 157.1

icalid

(TDC counts)

Hut 2.4.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.9

Hut 2.4.9 icalid

Δfit (TDC counts)

0.159167 ns/TDCcount

0 2000

4000

10 20 30

0.1701E+07/ 15 P1 474.6 P2 115.1

icalid

(TDC counts)

Hut 2.4.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.10

Hut 2.4.10 icalid

Δfit (TDC counts)

0.217178 ns/TDCcount

TDC calibrations Calib 8583.1

0 2000

4000

10 20 30

28.66 / 14 P1 -134.9 P2 152.7

icalid

(TDC counts)

Hut 2.4.11

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.11

Hut 2.4.11 icalid

Δfit (TDC counts)

0.163674 ns/TDCcount

0 2000

4000

10 20 30

28.22 / 15 P1 94.63 P2 150.7

icalid

(TDC counts)

Hut 2.4.12

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.12

Hut 2.4.12 icalid

Δfit (TDC counts)

0.165897 ns/TDCcount

0 2000

4000

10 20 30

22.31 / 15 P1 7.795 P2 150.1

icalid

(TDC counts)

Hut 2.4.13

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.13

Hut 2.4.13 icalid

Δfit (TDC counts)

0.166594 ns/TDCcount

0

2500

5000

10 20 30

21.06 / 14 P1 232.1 P2 150.3

icalid

(TDC counts)

Hut 2.4.14

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.14

Hut 2.4.14 icalid

Δfit (TDC counts)

0.166299 ns/TDCcount

0 2500

5000

10 20 30

11.22 / 14 P1 265.9 P2 157.2

icalid

(TDC counts)

Hut 2.5.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.3

Hut 2.5.3 icalid

Δfit (TDC counts)

0.158999 ns/TDCcount

TDC calibrations Calib 8583.1

0 2500

5000

10 20 30

8.762 / 14 P1 458.6 P2 157.7

icalid

(TDC counts)

Hut 2.5.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.4

Hut 2.5.4 icalid

Δfit (TDC counts)

0.158503 ns/TDCcount

0 2500

5000

10 20 30

13.94 / 15 P1 223.2 P2 155.5

icalid

(TDC counts)

Hut 2.5.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.5

Hut 2.5.5 icalid

Δfit (TDC counts)

0.160798 ns/TDCcount

0 2500

5000

10 20 30

12.62 / 15 P1 246.6 P2 154.6

icalid

(TDC counts)

Hut 2.5.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.6

Hut 2.5.6 icalid

Δfit (TDC counts)

0.161656 ns/TDCcount

0 2500

5000

10 20 30

8.303 / 14 P1 256.4 P2 154.9

icalid

(TDC counts)

Hut 2.5.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.7

Hut 2.5.7 icalid

Δfit (TDC counts)

0.161421 ns/TDCcount

0 2500

5000

10 20 30

16.59 / 14 P1 294.4 P2 155.6

icalid

(TDC counts)

Hut 2.5.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.8

Hut 2.5.8 icalid

Δfit (TDC counts)

0.160657 ns/TDCcount

TDC calibrations Calib 8583.1

0

2000

10 20 30

0.5034E+07/ 28 P1 1520. P2 26.27

icalid

(TDC counts)

Hut 2.5.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.9

Hut 2.5.9 icalid

Δfit (TDC counts)

0.951775 ns/TDCcount

0 2000

4000

10 20 30

18.96 / 14 P1 21.13 P2 151.5

icalid

(TDC counts)

Hut 2.5.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.10

Hut 2.5.10 icalid

Δfit (TDC counts)

0.16499 ns/TDCcount

0 2500

5000

10 20 30

14.49 / 14 P1 498.6 P2 152.5

icalid

(TDC counts)

Hut 2.6.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.3

Hut 2.6.3 icalid

Δfit (TDC counts)

0.163886 ns/TDCcount

0 2000

4000

10 20 30

16.78 / 15 P1 -49.97 P2 152.2

icalid

(TDC counts)

Hut 2.6.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.4

Hut 2.6.4 icalid

Δfit (TDC counts)

0.164255 ns/TDCcount

0 2500

5000

10 20 30

13.72 / 15 P1 246.6 P2 153.8

icalid

(TDC counts)

Hut 2.6.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.5

Hut 2.6.5 icalid

Δfit (TDC counts)

0.162582 ns/TDCcount

TDC calibrations Calib 8583.1

0 2500

5000

10 20 30

16.65 / 14 P1 172.4 P2 154.2

icalid

(TDC counts)

Hut 2.6.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.6

Hut 2.6.6 icalid

Δfit (TDC counts)

0.162149 ns/TDCcount

0 2500

5000

10 20 30

15.95 / 14 P1 316.4 P2 153.7

icalid

(TDC counts)

Hut 2.6.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.7

Hut 2.6.7 icalid

Δfit (TDC counts)

0.162657 ns/TDCcount

0 2500

5000

10 20 30

21.76 / 15 P1 416.9 P2 154.0

icalid

(TDC counts)

Hut 2.6.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.8

Hut 2.6.8 icalid

Δfit (TDC counts)

0.162342 ns/TDCcount

0 2500

5000

10 20 30

8.482 / 14 P1 351.7 P2 154.8

icalid

(TDC counts)

Hut 2.6.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.9

Hut 2.6.9 icalid

Δfit (TDC counts)

0.161472 ns/TDCcount

0 2500

5000

10 20 30

9.320 / 14 P1 785.9 P2 154.1

icalid

(TDC counts)

Hut 2.6.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.10

Hut 2.6.10 icalid

Δfit (TDC counts)

0.162199 ns/TDCcount

TDC calibrations Calib 8583.1

0 2500

5000

10 20 30

23.53 / 15 P1 289.6 P2 151.8

icalid

(TDC counts)

Hut 2.6.13

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.13

Hut 2.6.13 icalid

Δfit (TDC counts)

0.164669 ns/TDCcount

0

2500

5000

10 20 30

21.81 / 15 P1 104.2 P2 151.6

icalid

(TDC counts)

Hut 2.6.14

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.14

Hut 2.6.14 icalid

Δfit (TDC counts)

0.164912 ns/TDCcount

0 2500

5000

10 20 30

17.29 / 14 P1 551.4 P2 155.5

icalid

(TDC counts)

Hut 2.7.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.3

Hut 2.7.3 icalid

Δfit (TDC counts)

0.160746 ns/TDCcount

0 2500

5000

10 20 30

14.14 / 14 P1 684.9 P2 155.6

icalid

(TDC counts)

Hut 2.7.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.4

Hut 2.7.4 icalid

Δfit (TDC counts)

0.160626 ns/TDCcount

0 2500

5000

10 20 30

12.23 / 14 P1 319.2 P2 155.9

icalid

(TDC counts)

Hut 2.7.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.5

Hut 2.7.5 icalid

Δfit (TDC counts)

0.160314 ns/TDCcount

TDC calibrations Calib 8583.1

0 2500

5000

10 20 30

15.98 / 15 P1 535.0 P2 155.8

icalid

(TDC counts)

Hut 2.7.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.6

Hut 2.7.6 icalid

Δfit (TDC counts)

0.160498 ns/TDCcount

0 2500

5000

10 20 30

6609. / 14 P1 335.2 P2 157.5

icalid

(TDC counts)

Hut 2.7.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.7

Hut 2.7.7 icalid

Δfit (TDC counts)

0.158774 ns/TDCcount

0 2500

5000

10 20 30

12.88 / 15 P1 550.2 P2 155.2

icalid

(TDC counts)

Hut 2.7.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.8

Hut 2.7.8 icalid

Δfit (TDC counts)

0.161123 ns/TDCcount

0 2500

5000

10 20 30

14.96 / 14 P1 219.9 P2 154.8

icalid

(TDC counts)

Hut 2.7.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.9

Hut 2.7.9 icalid

Δfit (TDC counts)

0.161526 ns/TDCcount

0

2000

10 20 30

0.6147E+07/ 15 P1 1253. P2 62.62

icalid

(TDC counts)

Hut 2.7.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.10

Hut 2.7.10 icalid

Δfit (TDC counts)

0.399261 ns/TDCcount

TDC calibrations Calib 8583.1

0 2000

4000

10 20 30

13.18 / 14 P1 62.39 P2 150.9

icalid

(TDC counts)

Hut 2.7.13

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.13

Hut 2.7.13 icalid

Δfit (TDC counts)

0.165634 ns/TDCcount

0 2000

4000

10 20 30

23.43 / 15 P1 -12.88 P2 150.4

icalid

(TDC counts)

Hut 2.7.14

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.14

Hut 2.7.14 icalid

Δfit (TDC counts)

0.166258 ns/TDCcount

0 2500

5000

10 20 30

10.65 / 14 P1 280.9 P2 156.6

icalid

(TDC counts)

Hut 2.8.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.3

Hut 2.8.3 icalid

Δfit (TDC counts)

0.159612 ns/TDCcount

0 2500

5000

10 20 30

13.51 / 15 P1 233.4 P2 153.1

icalid

(TDC counts)

Hut 2.8.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.4

Hut 2.8.4 icalid

Δfit (TDC counts)

0.163267 ns/TDCcount

0 2500

5000

10 20 30

10.46 / 14 P1 456.2 P2 157.0

icalid

(TDC counts)

Hut 2.8.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.5

Hut 2.8.5 icalid

Δfit (TDC counts)

0.159262 ns/TDCcount

TDC calibrations Calib 8583.1

0 2500

5000

10 20 30

16.04 / 14 P1 354.5 P2 156.4

icalid

(TDC counts)

Hut 2.8.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.6

Hut 2.8.6 icalid

Δfit (TDC counts)

0.159803 ns/TDCcount

0

2500

5000

10 20 30

11.68 / 14 P1 50.96 P2 154.1

icalid

(TDC counts)

Hut 2.8.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.7

Hut 2.8.7 icalid

Δfit (TDC counts)

0.162225 ns/TDCcount

0 2500

5000

10 20 30

12.11 / 15 P1 483.5 P2 150.7

icalid

(TDC counts)

Hut 2.8.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.8

Hut 2.8.8 icalid

Δfit (TDC counts)

0.16587 ns/TDCcount

0 2500

5000

10 20 30

0.1157E+05/ 14 P1 241.9 P2 156.6

icalid

(TDC counts)

Hut 2.8.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.9

Hut 2.8.9 icalid

Δfit (TDC counts)

0.159623 ns/TDCcount

0

2500

5000

10 20 30

23.65 / 15 P1 148.3 P2 151.9

icalid

(TDC counts)

Hut 2.8.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.10

Hut 2.8.10 icalid

Δfit (TDC counts)

0.164567 ns/TDCcount

TDC calibrations Calib 8583.1

0 2500

5000

10 20 30

11.83 / 14 P1 195.0 P2 155.8

icalid

(TDC counts)

Hut 2.9.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.3

Hut 2.9.3 icalid

Δfit (TDC counts)

0.16045 ns/TDCcount

0 2500

5000

10 20 30

13.34 / 14 P1 500.5 P2 151.1

icalid

(TDC counts)

Hut 2.9.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.4

Hut 2.9.4 icalid

Δfit (TDC counts)

0.165493 ns/TDCcount

0 2500

5000

10 20 30

18.88 / 15 P1 273.2 P2 152.6

icalid

(TDC counts)

Hut 2.9.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.5

Hut 2.9.5 icalid

Δfit (TDC counts)

0.163812 ns/TDCcount

0 2500

5000

10 20 30

37.27 / 15 P1 548.4 P2 147.4

icalid

(TDC counts)

Hut 2.9.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.6

Hut 2.9.6 icalid

Δfit (TDC counts)

0.169607 ns/TDCcount

0 2500

5000

10 20 30

11.88 / 14 P1 367.0 P2 154.2

icalid

(TDC counts)

Hut 2.9.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.7

Hut 2.9.7 icalid

Δfit (TDC counts)

0.162127 ns/TDCcount

TDC calibrations Calib 8583.1

0 2500

5000

10 20 30

20.93 / 15 P1 271.4 P2 152.3

icalid

(TDC counts)

Hut 2.9.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.8

Hut 2.9.8 icalid

Δfit (TDC counts)

0.164108 ns/TDCcount

0 2000

4000

10 20 30

25.84 / 14 P1 -77.18 P2 151.0

icalid

(TDC counts)

Hut 2.9.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.9

Hut 2.9.9 icalid

Δfit (TDC counts)

0.165587 ns/TDCcount

0 2500

5000

10 20 30

32.18 / 14 P1 302.7 P2 152.7

icalid

(TDC counts)

Hut 2.10.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.4

Hut 2.10.4 icalid

Δfit (TDC counts)

0.163692 ns/TDCcount

0 2500

5000

10 20 30

28.25 / 15 P1 265.7 P2 151.2

icalid

(TDC counts)

Hut 2.10.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.5

Hut 2.10.5 icalid

Δfit (TDC counts)

0.165378 ns/TDCcount

0

2500

5000

10 20 30

23.75 / 15 P1 142.2 P2 151.2

icalid

(TDC counts)

Hut 2.10.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.6

Hut 2.10.6 icalid

Δfit (TDC counts)

0.165349 ns/TDCcount

TDC calibrations Calib 8583.1

0 2000

4000

10 20 30

0.7886E+06/ 15 P1 487.3 P2 118.5

icalid

(TDC counts)

Hut 2.10.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.7

Hut 2.10.7 icalid

Δfit (TDC counts)

0.210946 ns/TDCcount

0 2000

4000

10 20 30

20.06 / 14 P1 43.38 P2 150.9

icalid

(TDC counts)

Hut 2.10.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.8

Hut 2.10.8 icalid

Δfit (TDC counts)

0.165704 ns/TDCcount

0

2500

5000

10 20 30

24.43 / 14 P1 190.3 P2 151.5

icalid

(TDC counts)

Hut 2.10.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.9

Hut 2.10.9 icalid

Δfit (TDC counts)

0.16501 ns/TDCcount

0 2500

5000

10 20 30

13.85 / 14 P1 634.7 P2 155.4

icalid

(TDC counts)

Hut 2.11.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.3

Hut 2.11.3 icalid

Δfit (TDC counts)

0.16086 ns/TDCcount

0 2000

4000

10 20 30

0.5643E+06/ 15 P1 679.7 P2 129.6

icalid

(TDC counts)

Hut 2.11.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.4

Hut 2.11.4 icalid

Δfit (TDC counts)

0.192879 ns/TDCcount

TDC calibrations Calib 8583.1

0 2500

5000

10 20 30

24.17 / 15 P1 267.1 P2 153.6

icalid

(TDC counts)

Hut 2.11.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.5

Hut 2.11.5 icalid

Δfit (TDC counts)

0.162712 ns/TDCcount

0 2000

4000

10 20 30

41.92 / 17 P1 98.69 P2 134.2

icalid

(TDC counts)

Hut 2.11.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.6

Hut 2.11.6 icalid

Δfit (TDC counts)

0.186285 ns/TDCcount

0 2000

4000

10 20 30

20.28 / 15 P1 -29.66 P2 151.0

icalid

(TDC counts)

Hut 2.11.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.7

Hut 2.11.7 icalid

Δfit (TDC counts)

0.165562 ns/TDCcount

0 2000

4000

10 20 30

22.45 / 14 P1 69.01 P2 150.8

icalid

(TDC counts)

Hut 2.11.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.8

Hut 2.11.8 icalid

Δfit (TDC counts)

0.165833 ns/TDCcount

0 2500

5000

10 20 30

30.45 / 14 P1 201.6 P2 152.8

icalid

(TDC counts)

Hut 2.12.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.3

Hut 2.12.3 icalid

Δfit (TDC counts)

0.163646 ns/TDCcount

TDC calibrations Calib 8583.1

0

2000

4000

10 20 30

0.2744E+07/ 16 P1 774.5 P2 97.98

icalid

(TDC counts)

Hut 2.12.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.4

Hut 2.12.4 icalid

Δfit (TDC counts)

0.255158 ns/TDCcount

0 2000

4000

10 20 30

28.75 / 14 P1 40.44 P2 151.9

icalid

(TDC counts)

Hut 2.12.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.5

Hut 2.12.5 icalid

Δfit (TDC counts)

0.164608 ns/TDCcount

0 2500

5000

10 20 30

18.82 / 14 P1 381.1 P2 154.1

icalid

(TDC counts)

Hut 2.12.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.6

Hut 2.12.6 icalid

Δfit (TDC counts)

0.162219 ns/TDCcount

0 2000

4000

10 20 30

22.60 / 14 P1 -97.35 P2 150.6

icalid

(TDC counts)

Hut 2.12.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.7

Hut 2.12.7 icalid

Δfit (TDC counts)

0.166042 ns/TDCcount

0

2500

5000

10 20 30

24.77 / 15 P1 123.3 P2 151.2

icalid

(TDC counts)

Hut 2.12.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.8

Hut 2.12.8 icalid

Δfit (TDC counts)

0.165377 ns/TDCcount

TDC calibrations Calib 8583.1

0

2500

5000

10 20 30

25.60 / 14 P1 69.78 P2 152.7

icalid

(TDC counts)

Hut 2.13.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.3

Hut 2.13.3 icalid

Δfit (TDC counts)

0.163738 ns/TDCcount

0 2500

5000

10 20 30

9.619 / 14 P1 788.6 P2 155.0

icalid

(TDC counts)

Hut 2.13.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.4

Hut 2.13.4 icalid

Δfit (TDC counts)

0.161282 ns/TDCcount

0 2000

4000

10 20 30

26.57 / 14 P1 -93.16 P2 152.2

icalid

(TDC counts)

Hut 2.13.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.5

Hut 2.13.5 icalid

Δfit (TDC counts)

0.164209 ns/TDCcount

0

2500

5000

10 20 30

20.54 / 14 P1 77.61 P2 152.9

icalid

(TDC counts)

Hut 2.13.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.6

Hut 2.13.6 icalid

Δfit (TDC counts)

0.163503 ns/TDCcount

0 2500

5000

10 20 30

11.07 / 15 P1 412.2 P2 153.9

icalid

(TDC counts)

Hut 2.13.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.7

Hut 2.13.7 icalid

Δfit (TDC counts)

0.162395 ns/TDCcount

TDC calibrations Calib 8583.1

0 2000

4000

10 20 30

0.6636E+06/ 15 P1 483.4 P2 130.6

icalid

(TDC counts)

Hut 2.13.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.8

Hut 2.13.8 icalid

Δfit (TDC counts)

0.191439 ns/TDCcount

0 2500

5000

10 20 30

30.75 / 15 P1 237.3 P2 152.8

icalid

(TDC counts)

Hut 2.14.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.3

Hut 2.14.3 icalid

Δfit (TDC counts)

0.163641 ns/TDCcount

0 2500

5000

10 20 30

28.57 / 15 P1 277.9 P2 152.2

icalid

(TDC counts)

Hut 2.14.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.4

Hut 2.14.4 icalid

Δfit (TDC counts)

0.164271 ns/TDCcount

0 2500

5000

10 20 30

24.76 / 14 P1 200.2 P2 152.1

icalid

(TDC counts)

Hut 2.14.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.5

Hut 2.14.5 icalid

Δfit (TDC counts)

0.164389 ns/TDCcount

0 2500

5000

10 20 30

36.69 / 15 P1 235.6 P2 153.0

icalid

(TDC counts)

Hut 2.14.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.6

Hut 2.14.6 icalid

Δfit (TDC counts)

0.163412 ns/TDCcount

TDC calibrations Calib 8583.1

0 2500

5000

10 20 30

10.24 / 14 P1 500.1 P2 154.3

icalid

(TDC counts)

Hut 2.14.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.7

Hut 2.14.7 icalid

Δfit (TDC counts)

0.161998 ns/TDCcount

0 2500

5000

10 20 30

7.994 / 14 P1 442.5 P2 154.0

icalid

(TDC counts)

Hut 2.14.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.8

Hut 2.14.8 icalid

Δfit (TDC counts)

0.162369 ns/TDCcount